\hypertarget{structibuf}{
\section{ibuf Struct Reference}
\label{structibuf}\index{ibuf@{ibuf}}
}
{\tt \#include $<$ibuf.h$>$}

\subsection*{Data Fields}
\begin{CompactItemize}
\item 
\hyperlink{structiobuf}{iobuf} \hyperlink{structibuf_d0d711b17de745f857fc4184bcc59786}{io}
\item 
unsigned \hyperlink{structibuf_7e005577893b9eee0ec57bc50775b885}{count}
\item 
\hyperlink{group__ibuf_gef08f9c3cf7f85292ca368ca62ab0e4a}{ibuf\_\-fn} \hyperlink{structibuf_68420a8b6a6bad68c27106f10abbbb75}{readfn}
\end{CompactItemize}


\subsection{Detailed Description}
Input specific buffer. 

\subsection{Field Documentation}
\hypertarget{structibuf_d0d711b17de745f857fc4184bcc59786}{
\index{ibuf@{ibuf}!io@{io}}
\index{io@{io}!ibuf@{ibuf}}
\subsubsection{\setlength{\rightskip}{0pt plus 5cm}{\bf iobuf} {\bf ibuf::io}}}
\label{structibuf_d0d711b17de745f857fc4184bcc59786}


Base {\tt \hyperlink{structiobuf}{iobuf}} structure. \hypertarget{structibuf_7e005577893b9eee0ec57bc50775b885}{
\index{ibuf@{ibuf}!count@{count}}
\index{count@{count}!ibuf@{ibuf}}
\subsubsection{\setlength{\rightskip}{0pt plus 5cm}unsigned {\bf ibuf::count}}}
\label{structibuf_7e005577893b9eee0ec57bc50775b885}


The number of bytes read in the last operation. \hypertarget{structibuf_68420a8b6a6bad68c27106f10abbbb75}{
\index{ibuf@{ibuf}!readfn@{readfn}}
\index{readfn@{readfn}!ibuf@{ibuf}}
\subsubsection{\setlength{\rightskip}{0pt plus 5cm}{\bf ibuf\_\-fn} {\bf ibuf::readfn}}}
\label{structibuf_68420a8b6a6bad68c27106f10abbbb75}


Function used to read data from the file descriptor. 

The documentation for this struct was generated from the following file:\begin{CompactItemize}
\item 
ibuf.h\end{CompactItemize}
